depth [m] cross track (southeast) a:shipboard; b,c:lowered

a

Fall97 0 100 200 300 400

b

0 100 200 300 400

121 122 123 124 125 126 127depth [m]

c

Celtic Shelf

-16-15.5-15-14.5

0 500 1000 1500 2000 2500 3000 3500 4000 4500

-16-15.5-15-14.5 -10 0 10 tide [cm s -1] longitude

-50 -40 -30 -20 -10 0 10 20 30 40 50 cm s -1

16.49°W, 50.87°N to 14.25°W, 51.50°N: 1997/11/04 to 1997/11/05